All figures should be submitted in computer form. We only accept PostScript files from any graphic package. Names of submitted PostScript files should be in the form: fig1.ps, fig2.ps, ... or fig1.eps, fig2.eps, ...

When a figure is composed of a few parts it must not exceed one page and each part should be legibly described by letter. Please notice that the descriptions in the figures should be readable after twofold reduction of their size. All the figures should be numbered consecutively in Arabic numerals and referred to in the text as e.g., Fig. 2 or Figs. 2–5. Every figure should have a legend explaining all the symbols used in the figure and stating concisely the points the Author wishes the reader to notice.