Appendix B

FU/FO Double-Mode Cepheids

SMC SC1

SMC SC2

SMC SC4

SMC SC4

SMC SC5

SMC SC5

SMC SC6

SMC SC7

SMC SC7

SMC SC8

SMC SC10

SMC SC11